; HTBswitch.def : Declares the module parameters for the DLL.

LIBRARY      "HTBswitch"
DESCRIPTION  'HTBswitch Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here

	Switch
	Closeswitch